% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\Omega_b^{*-}$}\ \ \ \ \ \ \ $*$}
\maketitle
The $\Omega_b^{*-}$ has not been observed and is only included to complete the lightest multiplet of baryons containing one bottom quark. The mass is calculated using the mass splitting from the charm system and the mass of the $\Lambda_b$ which gives a higher mass than many theoretical calculations. Due to the mass difference with the $\Omega_b$ there are no strong decay modes allowed and therefore we assume the radiative mode is the only one. The width is calculated using the decayer and the $\Omega_b^{*-}$ is allowed to be off-shell by ten times the width.
The $\Omega_b^{*-}$ has mass $6105.84$~MeV and is unstable. The $\Omega_b^{*-}$ has spin $3/2$, charge $-1$ and is colour neutral.
 The $\Omega_b^{*-}$ is a baryon and is from the $(56,0^+_0)$ $35$plet.The $\Omega_b^{*-}$ has width $0.005$~MeV. The lower limit on the mass of the particle is $0.05$~MeV and the upper limit is $0.05$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 5334.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\Omega_b^{*-}$ (continues).}
\endfoot
\caption{The decay modes of the $\Omega_b^{*-}$.}
\endlastfoot
\label{tab:5334decaymodes}
1.000000 & $**$ & on & $ \Omega_b^-, \gamma $  & The radiative of $\Omega_b^{*-}$ to the $\Omega_b$ which is assumed to be the only decay mode.    & Herwig::RadiativeHeavyBaryon::HeavyGamma \\ 
\hline
\end{longtable}The $\Omega_b^{*-}$ decay modes are given in Table~\ref{tab:5334decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Omega_b*-Mass| for the $\Omega_b^{*-}$.
The width generator is \verb|Omega_b*-Width| for the $\Omega_b^{*-}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:23:26 on the 4th of February 2009. The most recently changed decay mode was modified at 10:27:5 on the 4th of April 2005. The particle data was last modified at 13:55:36 on the 6th of July 2008.

\end{document}
