% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $B_s^{*0}$}\ \ \ \ \ \ \ $***$}
\maketitle
The $B_s^{*0}$ has been observed and the mass measured although it is omitted from the summary tables in \cite{Yao:2006px}. The measured mass is such that there are no allowed strong decays and therefore the dominant decay is to $B_s^0$ and a photon. The width has not been measured and therefore we use the theoretical calculation of \cite{Bardeen:2003kt} . The $B_s^{*0}$ is allowed to be off-shell by ten times the width.
The $B_s^{*0}$ has mass $5412.8$~MeV and is unstable. The $B_s^{*0}$ has spin $1$, charge $0$ and is colour neutral.
 The $B_s^{*0}$ is a meson and is from the $1^3S_1$ multiplet.The $B_s^{*0}$ has width $0.00015$~MeV. The lower limit on the mass of the particle is $0.0015$~MeV and the upper limit is $0.0015$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 533.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $B_s^{*0}$ (continues).}
\endfoot
\caption{The decay modes of the $B_s^{*0}$.}
\endlastfoot
\label{tab:533decaymodes}
1.000000 & $****$ & on & $ B_s^{0}, \gamma $  & The only observed and, based on the mass difference with the $B_s^0$, dominant decay of the $B_s^{*0}$.   & Herwig::VectorMesonVectorPScalar::VectorVP \\ 
\hline
\end{longtable}The $B_s^{*0}$ decay modes are given in Table~\ref{tab:533decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|B_s*mass| for the $B_s^{*0}$.
The width generator is \verb|B_s*width| for the $B_s^{*0}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:22:0 on the 20th of October 2007. The most recently changed decay mode was modified at 19:0:49 on the 9th of August 2007. The particle data was last modified at 12:55:9 on the 3rd of August 2007.

\end{document}
