\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $B^{*+}$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &523 & & & Mass & 5325& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 0.00078& & & Gen  & \verb: B*+: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $B^{*+} $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:B*+mass: \ \ & Width Gen.  & \verb:B*+width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 0.0078& Upper cut & 0.0078& PDG link &s085 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $B^{*+}$ is the lightest vector charged B-meson. The mass is measured and taken from \cite{Yao:2006px} although the lifetime is not. Due to the small mass difference with the lightest pseudoscalar B-mesons the $B^{*+}$ can not decay strongly and therefore the radiative decay is dominant.  The width is taken from the theoretical calculation in \cite{Bardeen:2003kt}  and the $B^{*+}$ is allowed to be off-shell by ten times this width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $B^{*+}$ (continues).}
\endfoot
\caption{The decay modes of the $B^{*+}$.}
\endlastfoot
\label{tab:523decaymodes}
1.000000 & $****$ & $B^+$, $\gamma$ & & Herwig::VectorMesonVectorPScalar::VectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
