% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $B^{*0}$}\ \ \ \ \ \ \ $***$}
\maketitle
The $B^{*0}$ is the lightest vector charged B-meson. The mass is measured and taken from \cite{Yao:2006px} although the lifetime is not. Due to the small mass difference with the lightest pseudoscalar B-mesons the $B^{*0}$ can not decay strongly and therefore the radiative decay is dominant. The width is taken from the theoretical calculation in \cite{Bardeen:2003kt}  and the $B^{*0}$ is allowed to be off-shell by ten times this width.
The $B^{*0}$ has mass $5325$~MeV and is unstable. The $B^{*0}$ has spin $1$, charge $0$ and is colour neutral.
 The $B^{*0}$ is a meson and is from the $1^3S_1$ multiplet.The $B^{*0}$ has width $0.00024$~MeV. The lower limit on the mass of the particle is $0.0024$~MeV and the upper limit is $0.0024$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 513.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $B^{*0}$ (continues).}
\endfoot
\caption{The decay modes of the $B^{*0}$.}
\endlastfoot
\label{tab:513decaymodes}
1.000000 & $****$ & on & $ B^0, \gamma $  & The radiative decay of the $B^{*0}$ which is the only mode included.   & Herwig::VectorMesonVectorPScalar::VectorVP \\ 
\hline
\end{longtable}The $B^{*0}$ decay modes are given in Table~\ref{tab:513decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|B*0mass| for the $B^{*0}$.
The width generator is \verb|B*0width| for the $B^{*0}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:8:18 on the 10th of August 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
