% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\Lambda_{b1}^{*0}$}\ \ \ \ \ \ \ $*$}
\maketitle
The $\Lambda_{b1}^{*0}$ has not been observed and is added to give the same set of baryons containing one bottom quark as we have baryons including one charm quark. The mass is calculated using the mass splitting from the charm system and the $\Lambda_b$ mass. The decays are assumed to have the same form as the corresponding charm state. The width is taken to be the same as for the charm state and the $\Lambda_{b1}^{*0}$ is allowed to be off-shell by ten times the width.
The $\Lambda_{b1}^{*0}$ has mass $5965.64$~MeV and is unstable. The $\Lambda_{b1}^{*0}$ has spin $3/2$, charge $0$ and is colour neutral.
 The $\Lambda_{b1}^{*0}$ is a baryon$\bar{10}$plet.The $\Lambda_{b1}^{*0}$ has width $1.5$~MeV. The lower limit on the mass of the particle is $15$~MeV and the upper limit is $15$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 5124.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\Lambda_{b1}^{*0}$ (continues).}
\endfoot
\caption{The decay modes of the $\Lambda_{b1}^{*0}$.}
\endlastfoot
\label{tab:5124decaymodes}
0.666667 & $*$ & on & $ \Lambda_b^0, \pi^+, \pi^- $  & Decay of the $\Lambda_{b1}^{*0}$ to $\Lambda_b\pi\pi$ the branching ratio is set to the same value as for the charm state.   & Herwig::Hw64::DecayME0 \\ 
\hline
0.333333 & $*$ & on & $ \Lambda_b^0, \pi^0, \pi^0 $  & Decay of the $\Lambda_{b1}^{*0}$ to $\Lambda_b\pi\pi$ the branching ratio is set to the same value as for the charm state.   & Herwig::Hw64::DecayME0 \\ 
\hline
\end{longtable}The $\Lambda_{b1}^{*0}$ decay modes are given in Table~\ref{tab:5124decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Lambda*_bMass| for the $\Lambda_{b1}^{*0}$.
The width generator is \verb|Lambda*_bWidth| for the $\Lambda_{b1}^{*0}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:20:15 on the 4th of February 2009. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:2:28 on the 6th of July 2008.

\end{document}
