% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\Sigma_b^{*-}$}\ \ \ \ \ \ \ $***$}
\maketitle
The $\Sigma^{*+}_b$ and $\Sigma^{*-}_b$ have been observed \cite{cdf:2007rw} . The mass is calculated using the relevant $\Sigma_b$ and the mass difference from \cite{cdf:2007rw} . The mass difference is such that the only allowed strong decay is to $\Lambda_b$ and a pion which we assume is the only mode. The lower limit on the mass is set to ensure the decay is kinematically allowed and the upper limit is set to five times the width.
The $\Sigma_b^{*-}$ has mass $5836.4$~MeV and is unstable. The $\Sigma_b^{*-}$ has spin $3/2$, charge $-1$ and is colour neutral.
 The $\Sigma_b^{*-}$ is a baryon and is from the $(56,0^+_0)$ $35$plet.The $\Sigma_b^{*-}$ has width $15.6$~MeV. The lower limit on the mass of the particle is $78$~MeV and the upper limit is $78$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 5114.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\Sigma_b^{*-}$ (continues).}
\endfoot
\caption{The decay modes of the $\Sigma_b^{*-}$.}
\endlastfoot
\label{tab:5114decaymodes}
1.000000 & $**$ & on & $ \Lambda_b^0, \pi^- $  & Only kinematically possible strong decay mode of $\Sigma_b^{*-}$ which is assumed to be the only mode.    & Herwig::StrongHeavyBaryon::HeavyStrong \\ 
\hline
\end{longtable}The $\Sigma_b^{*-}$ decay modes are given in Table~\ref{tab:5114decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Sigma*_b-Mass| for the $\Sigma_b^{*-}$.
The width generator is \verb|Sigma*_b-Width| for the $\Sigma_b^{*-}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:27:31 on the 4th of February 2009. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:34:58 on the 6th of July 2008.

\end{document}
