\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $D^{*0}_2(2460)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &425 & & & Mass & 2461.1& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 43& & & Gen  & \verb: D*_20: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $D^{*0}_2(2460) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:D_20mass: \ \ & Width Gen.  & \verb:D_20width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $2$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 215& Upper cut & 215& PDG link &m119 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $D^{*0}_2(2460)$ is the neutral charm member of the lightest tensor multiplet. The mass and width are taken from \cite{Yao:2006px}. The only observed decay modes are $D\pi$ and $D^*\pi$. The ratio of the branching ratios for these modes has been measured and for the same modes of the charged tensor meson. We have therefore chosen to average these measurements, including the recent result from \cite{Abe:2003zm}  to obtain
\begin{equation}
\frac{\Gamma(D\pi)}{\Gamma(D^*\pi)}=2.05\pm 0.36,
\end{equation}
and only include these modes in order to obtain the branching ratios. This is similar to the approach in EvtGEN but does not include the $D^*\pi\pi$ or $D\eta$ modes which were included in FORTRAN HERWIG. The particle is allowed to be off-shell by up to five times the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $D^{*0}_2(2460)$ (continues).}
\endfoot
\caption{The decay modes of the $D^{*0}_2(2460)$.}
\endlastfoot
\label{tab:425decaymodes}
0.448087 & $***$ & $D^+$, $\pi^-$ & & Herwig::TensorMeson2PScalar::Tensor2PScalar& \\ 
& & & & & \\ \hline
0.224044 & $***$ & $D^0$, $\pi^0$ & & Herwig::TensorMeson2PScalar::Tensor2PScalar& \\ 
& & & & & \\ \hline
0.218579 & $***$ & $D^{*+}(2010)$, $\pi^-$ & & Herwig::TensorMesonVectorPScalar::TensorVP& \\ 
& & & & & \\ \hline
0.109290 & $***$ & $D^{*0}(2007)$, $\pi^0$ & & Herwig::TensorMesonVectorPScalar::TensorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
