% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $D^{*+}(2010)$}\ \ \ \ \ \ \ $*****$}
\maketitle
The $D^{*+}(2010)$ is the the charged charm meson from the lightest vector multiplet. The mass and width are taken from \cite{Yao:2006px} as are the branching ratios from the observed modes. The $D^{*+}(2010)$ is allowed to be off-shell by ten times the width. There are minor differences with the width and branching ratios used in EvtGen.
The $D^{*+}(2010)$ has mass $2010$~MeV and is unstable. The $D^{*+}(2010)$ has spin $1$, charge $1$ and is colour neutral.
 The $D^{*+}(2010)$ is a meson and is from the $1^3S_1$ multiplet.The $D^{*+}(2010)$ has width $0.096$~MeV. The lower limit on the mass of the particle is $0.96$~MeV and the upper limit is $0.96$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 413.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $D^{*+}(2010)$ (continues).}
\endfoot
\caption{The decay modes of the $D^{*+}(2010)$.}
\endlastfoot
\label{tab:413decaymodes}
0.677000 & $*****$ & on & $ D^0, \pi^+ $  & The decay of the vector D state to the pseudoscalar one and a pion with branching ratio taken from \cite{Yao:2006px}.   & Herwig::VectorMeson2Meson::Vector2Meson \\ 
\hline
0.307000 & $*****$ & on & $ D^+, \pi^0 $  & The decay of the vector D state to the pseudoscalar one and a pion with branching ratio taken from \cite{Yao:2006px}.   & Herwig::VectorMeson2Meson::Vector2Meson \\ 
\hline
0.016000 & $*****$ & on & $ D^+, \gamma $  & The decay of the vector D state to the pseudoscalar one and a photon with branching ratio taken from \cite{Yao:2006px}.   & Herwig::VectorMesonVectorPScalar::VectorVP \\ 
\hline
\end{longtable}The $D^{*+}(2010)$ decay modes are given in Table~\ref{tab:413decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|D*+mass| for the $D^{*+}(2010)$.
The width generator is \verb|D*+width| for the $D^{*+}(2010)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 11:54:0 on the 15th of April 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
