% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\Sigma^{*0}_c$}\ \ \ \ \ \ \ $****$}
\maketitle
The $\Sigma^{*0}_c$ is the neutral member of the second $\Sigma_c$ multiplet. The mass, width and branching ratios are taken from \cite{Yao:2006px}. The $\Sigma^{*0}_c$ is allowed to be off-shell by five times the width.
The $\Sigma^{*0}_c$ has mass $2518$~MeV and is unstable. The $\Sigma^{*0}_c$ has spin $3/2$, charge $0$ and is colour neutral.
 The $\Sigma^{*0}_c$ is a baryon and is from the $(56,0^+_0)$ $35$plet.The $\Sigma^{*0}_c$ has width $16.1$~MeV. The lower limit on the mass of the particle is $82.5$~MeV and the upper limit is $82.5$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 4114.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\Sigma^{*0}_c$ (continues).}
\endfoot
\caption{The decay modes of the $\Sigma^{*0}_c$.}
\endlastfoot
\label{tab:4114decaymodes}
1.000000 & $****$ & on & $ \Lambda_c^+, \pi^- $  & Hadronic decay of $\Sigma^{*0}_c$ with branching ratio from \cite{Yao:2006px}.   & Herwig::StrongHeavyBaryon::HeavyStrong \\ 
\hline
\end{longtable}The $\Sigma^{*0}_c$ decay modes are given in Table~\ref{tab:4114decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Sigma*_c0Mass| for the $\Sigma^{*0}_c$.
The width generator is \verb|Sigma*_c0Width| for the $\Sigma^{*0}_c$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:27:40 on the 4th of February 2009. The most recently changed decay mode was modified at 19:54:5 on the 24th of July 2005. The particle data was last modified at 17:28:30 on the 3rd of July 2008.

\end{document}
