\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\phi_3(1850)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &337 & & & Mass & 1854& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 87& & & Gen  & \verb: phi_3: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\phi_3(1850) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:phi_3Mass: \ \ & Width Gen.  & \verb:phi_3Width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $3$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 435& Upper cut & 435& PDG link &m054 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\phi_3(1850)$ is the heavier isospin singlet from the lightest spin-$3$ multiplet. The mass and width have been measured although the error for the width is large. Two decay modes have been observed but the branching ratios are not given in \cite{Yao:2006px}. There is however one measurement, although with large errors, of the ratio of the branching ratios for these two modes
\begin{equation}
\frac{\Gamma(KK^*)}{\Gamma(K\bar{K})} = {0.55^{+0.85}\!\!\!\!\!\!}_{-0.45}
\end{equation}
  which we use together with the assumption that these are the only modes to calculate the branching ratios. Given the large width of the $\phi_3(1850)$ we allow it to be off-shell by five times the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\phi_3(1850)$ (continues).}
\endfoot
\caption{The decay modes of the $\phi_3(1850)$.}
\endlastfoot
\label{tab:337decaymodes}
0.322582 & $***$ & $K^+$, $K^-$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.322582 & $***$ & $K^0$, $\bar{K}^0$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.088709 & $***$ & $K^{*+}$, $K^-$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.088709 & $***$ & $K^{*-}$, $K^+$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.088709 & $***$ & $K^{*0}$, $\bar{K}^0$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.088709 & $***$ & $\bar{K}^{*0}$, $K^0$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
