% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\Xi^{*-}$}\ \ \ \ \ \ \ $*****$}
\maketitle
The $\Xi^{*-}$ is the charged doubly strange member of the lightest $SU(3)$ decuplet. The mass and width are measured although the error on the width is relatively large. Only the dominant decay has been observed together with a limit on the radiative mode. The lower limit on the off-shell mass is set so that the decay is kinematically allowed and the upper limit to ten times the widths.
The $\Xi^{*-}$ has mass $1535$~MeV and is unstable. The $\Xi^{*-}$ has spin $3/2$, charge $-1$ and is colour neutral.
 The $\Xi^{*-}$ is a baryon and is from the $(56,0^+_0)$ $35$plet.The $\Xi^{*-}$ has width $9.9$~MeV. The lower limit on the mass of the particle is $70$~MeV and the upper limit is $99$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 3314.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\Xi^{*-}$ (continues).}
\endfoot
\caption{The decay modes of the $\Xi^{*-}$.}
\endlastfoot
\label{tab:3314decaymodes}
0.666667 & $*****$ & on & $ \Xi^0, \pi^- $  & Decay of the $\Xi^{*-}$ to a $\Xi$ and a pion with the relative rates for the two modes given by isospin.   & Herwig::SU3BaryonDecupletOctetScalar::SU3Decuplet \\ 
\hline
0.333333 & $*****$ & on & $ \Xi^-, \pi^0 $  & Decay of the $\Xi^{*-}$ to a $\Xi$ and a pion with the relative rates for the two modes given by isospin.   & Herwig::SU3BaryonDecupletOctetScalar::SU3Decuplet \\ 
\hline
\end{longtable}The $\Xi^{*-}$ decay modes are given in Table~\ref{tab:3314decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Xi*-Mass| for the $\Xi^{*-}$.
The width generator is \verb|Xi*-Width| for the $\Xi^{*-}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:23:51 on the 4th of February 2009. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
