\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $h^0$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &25 & & & Mass & 115000& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 3.196& & & Gen  & \verb: h0: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $h^0 $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:HiggsMass: \ \ & Width Gen.  & \verb:HiggsWidth: \ \ & Type        & gauge boson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$**$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & variable \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $0$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 31.96& Upper cut & 31.96& PDG link & & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The Standard Model Higgs boson is included with mass just above the experimental limit and width and branching ratios calculated using HDECAY. These branching ratios are indicative only as the width generator is used to calculate the branching ratios which vary with the off-shell mass.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $h^0$ (continues).}
\endfoot
\caption{The decay modes of the $h^0$.}
\endlastfoot
\label{tab:25decaymodes}
0.732200 & $***$ & $b$, $\bar{b}$ & & Herwig::SMHiggsFermions::Hff& \\ 
& & & & & \\ \hline
0.080600 & $***$ & $W^+$, $W^-$ & & Herwig::SMHiggsWW::HWW& \\ 
& & & & & \\ \hline
0.074200 & $***$ & $\tau^-$, $\tau^+$ & & Herwig::SMHiggsFermions::Hff& \\ 
& & & & & \\ \hline
0.070200 & $***$ & $g$, $g$ & & Herwig::Mambo::Mambo& \\ 
& & & & & \\ \hline
0.032200 & $***$ & $c$, $\bar{c}$ & & Herwig::SMHiggsFermions::Hff& \\ 
& & & & & \\ \hline
0.008200 & $***$ & $Z^0$, $Z^0$ & & Herwig::SMHiggsWW::HWW& \\ 
& & & & & \\ \hline
0.002100 & $***$ & $\gamma$, $\gamma$ & & Herwig::Mambo::Mambo& \\ 
& & & & & \\ \hline
0.000300 & $***$ & $\mu^-$, $\mu^+$ & & Herwig::SMHiggsFermions::Hff& \\ 
& & & & & \\ \hline
0.000000 & $***$ & $t$, $\bar{t}$ & & Herwig::SMHiggsFermions::Hff& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
