% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $h^0$}\ \ \ \ \ \ \ $**$}
\maketitle
The Standard Model Higgs boson is included with mass just above the experimental limit and width and branching ratios calculated using HDECAY. These branching ratios are indicative only as the width generator is used to calculate the branching ratios which vary with the off-shell mass.
The $h^0$ has mass $115000$~MeV and is unstable. The $h^0$ has spin $0$, charge $0$ and is colour neutral.
 The $h^0$ is a gauge boson.
The $h^0$ has width $3.196$~MeV. The lower limit on the mass of the particle is $31.96$~MeV and the upper limit is $31.96$~MeV. These are the deviations from the on-shell value. The branching ratios are allowed to vary with the off-shell mass of the particle.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 25.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $h^0$ (continues).}
\endfoot
\caption{The decay modes of the $h^0$.}
\endlastfoot
\label{tab:25decaymodes}
0.732200 & $***$ & on & $ b, \bar{b} $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsFermions::Hff \\ 
\hline
0.080600 & $***$ & on & $ W^+, W^- $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsWW::HWW \\ 
\hline
0.074200 & $***$ & on & $ \tau^-, \tau^+ $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsFermions::Hff \\ 
\hline
0.070200 & $***$ & on & $ g, g $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::Mambo::Mambo \\ 
\hline
0.032200 & $***$ & on & $ c, \bar{c} $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsFermions::Hff \\ 
\hline
0.008200 & $***$ & on & $ Z^0, Z^0 $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsWW::HWW \\ 
\hline
0.002100 & $***$ & on & $ \gamma, \gamma $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::Mambo::Mambo \\ 
\hline
0.000300 & $***$ & on & $ \mu^-, \mu^+ $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsFermions::Hff \\ 
\hline
0.000000 & $***$ & on & $ t, \bar{t} $  & Decay of the $h^0$ with branching ratio calculated using HDECAY.   & Herwig::SMHiggsFermions::Hff \\ 
\hline
\end{longtable}The $h^0$ decay modes are given in Table~\ref{tab:25decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|HiggsMass| for the $h^0$.
The width generator is \verb|HiggsWidth| for the $h^0$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 15:15:11 on the 13th of May 2008. The most recently changed decay mode was modified at 11:56:51 on the 15th of November 2007. The particle data was last modified at 15:15:7 on the 13th of May 2008.

\end{document}
