% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $g$}\ \ \ \ \ \ \ $*****$}
\maketitle
The gluon is the gauge boson carrying the strong force.
The $g$ has mass $0$~MeV and is stable. The $g$ has spin $1$, charge $0$ and is a a colour octet.
 The $g$ is a gauge boson.
The particle is a constituent of the hadrons and the constituent mass is 900 MeV. The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 21.
There are no decay modes for the $g$.



 There is no mass generator for the $g$.
 There is no width generator for the $g$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:10:31 on the 20th of October 2007. The most recently changed decay mode was modified at 0:0:0 on the 0th of 0. The particle data was last modified at 21:4:23 on the 20th of October 2007.

\end{document}
