\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $a_1^0(1260)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &20113 & & & Mass & 1240& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 560& & & Gen  & \verb: a_10: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $a_1^0(1260) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:a_10mass: \ \ & Width Gen.  & \verb:a_10width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$****$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & variable \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 560& Upper cut & 560& PDG link &m010 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $a_1^0(1260)$ is observed by a number of experiments however there is no consensus about the value for its mass and width. We therefore use the values from \cite{Link:2007fi}  which are in line with other recent measurements. We use variable branching ratios for the $a_1^0(1260)$ and therefore the branching ratios in the decay table which are for the $a_1$ in tau decay are indicative not used in the simulation. As the width is large the $a_1^0(1260)$ is allowed to be off-shell by the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $a_1^0(1260)$ (continues).}
\endfoot
\caption{The decay modes of the $a_1^0(1260)$.}
\endlastfoot
\label{tab:20113decaymodes}
0.987199 & $*****$ & $\pi^+$, $\pi^-$, $\pi^0$ & & Herwig::a1Simple::a1Simple& \\ 
& & & & & \\ \hline
0.006400 & $*****$ & $K^{*+}$, $K^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.006400 & $*****$ & $K^{*0}$, $\bar{K}^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.000001 & $*****$ & $\pi^0$, $\gamma$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
