% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\eta_b(3S)$}\ \ \ \ \ \ \ $*$}
\maketitle
The $\eta_b(3S)$ has not been observed. The mass, width and branching ratios are taken from \cite{Godfrey:2002rp} . It is included because it is included in EvtGen. The $\eta_b(3S)$ is allowed to be off-shell by ten times the width.
The $\eta_b(3S)$ has mass $10337$~MeV and is unstable. The $\eta_b(3S)$ has spin $0$, charge $0$ and is colour neutral.
 The $\eta_b(3S)$ is a meson and is from the $3^1S_0$ multiplet.The $\eta_b(3S)$ has width $2.7$~MeV. The lower limit on the mass of the particle is $27$~MeV and the upper limit is $27$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 200551.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\eta_b(3S)$ (continues).}
\endfoot
\caption{The decay modes of the $\eta_b(3S)$.}
\endlastfoot
\label{tab:200551decaymodes}
0.998300 & $**$ & on & $ g, g $  & Decay of $\eta_b(3S)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
0.001200 & $*$ & on & $ h_b(2P), \gamma $  & Decay of $\eta_b(3S)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
0.000500 & $*$ & on & $ h_b, \gamma $  & Decay of $\eta_b(3S)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
\end{longtable}The $\eta_b(3S)$ decay modes are given in Table~\ref{tab:200551decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|eta_b(3S)Mass| for the $\eta_b(3S)$.
The width generator is \verb|eta_b(3S)Width| for the $\eta_b(3S)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 8:47:1 on the 24th of April 2007. The most recently changed decay mode was modified at 13:18:35 on the 30th of July 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
