% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ ${\Xi}_{b1}^0$}\ \ \ \ \ \ \ $*$}
\maketitle
The ${\Xi}_{b1}^0$ has not been observed and is only included to complete the multiplet. The mass is obtained using the mass difference from the charm system and the mass of the $\Xi_b$. The decay modes and width are calculated using the results of \cite{Ivanov:1999bk}  assuming the couplings are the same in the bottom and charm systems. The ${\Xi}_{b1}^0$ is allowed to be off-shell by ten times the width.
The ${\Xi}_{b1}^0$ has mass $6111.1$~MeV and is unstable. The ${\Xi}_{b1}^0$ has spin $1/2$, charge $0$ and is colour neutral.
 The ${\Xi}_{b1}^0$ is a baryon and is from the $(56,0^+_0)$ $40$plet.The ${\Xi}_{b1}^0$ has width $1.4$~MeV. The lower limit on the mass of the particle is $14$~MeV and the upper limit is $14$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 15322.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the ${\Xi}_{b1}^0$ (continues).}
\endfoot
\caption{The decay modes of the ${\Xi}_{b1}^0$.}
\endlastfoot
\label{tab:15322decaymodes}
0.666667 & $**$ & on & $ {\Xi'}_b^-, \pi^+ $  & Decay mode of ${\Xi}_{b1}^0$ to $\Xi_b'\pi$ with branching ratio given by isospin.   & Herwig::StrongHeavyBaryon::HeavyStrong \\ 
\hline
0.333333 & $**$ & on & $ {\Xi'}_b^0, \pi^0 $  & Decay mode of ${\Xi}_{b1}^0$ to $\Xi_b'\pi$ with branching ratio given by isospin.   & Herwig::StrongHeavyBaryon::HeavyStrong \\ 
\hline
\end{longtable}The ${\Xi}_{b1}^0$ decay modes are given in Table~\ref{tab:15322decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Xi_b10Mass| for the ${\Xi}_{b1}^0$.
The width generator is \verb|Xi_b10Width| for the ${\Xi}_{b1}^0$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:21:58 on the 4th of February 2009. The most recently changed decay mode was modified at 21:26:16 on the 9th of August 2005. The particle data was last modified at 13:56:52 on the 6th of July 2008.

\end{document}
