% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $h_b(2P)$}\ \ \ \ \ \ \ $*$}
\maketitle
The $h_b(2P)$ has not been observed and is included because it is included in EvtGen. The mass,width and branching ratios are taken from \cite{Godfrey:2002rp} . The $h_b(2P)$ is allowed to be off-shell by ten times the width.
The $h_b(2P)$ has mass $10258$~MeV and is unstable. The $h_b(2P)$ has spin $1$, charge $0$ and is colour neutral.
 The $h_b(2P)$ is a meson and is from the $2^1P_1$ multiplet.The $h_b(2P)$ has width $0.08$~MeV. The lower limit on the mass of the particle is $0.8$~MeV and the upper limit is $0.8$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 110553.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $h_b(2P)$ (continues).}
\endfoot
\caption{The decay modes of the $h_b(2P)$.}
\endlastfoot
\label{tab:110553decaymodes}
0.628000 & $**$ & on & $ g, g, g $  & Decay of $h_b(2P)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Quarkonium::QDecayME130 \\ 
\hline
0.193000 & $*$ & on & $ \eta_b(2S), \gamma $  & Decay of $h_b(2P)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
0.125000 & $*$ & on & $ \eta_b, \gamma $  & Decay of $h_b(2P)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
0.034000 & $*$ & on & $ \eta_{b2}(1D), \gamma $  & Decay of $h_b(2P)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Hw64::DecayME0 \\ 
\hline
0.020000 & $**$ & on & $ g, g, \gamma $  & Decay of $h_b(2P)$ with branching ratio taken from \cite{Godfrey:2002rp} .   & Herwig::Quarkonium::QDecayME130 \\ 
\hline
\end{longtable}The $h_b(2P)$ decay modes are given in Table~\ref{tab:110553decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|h_b(2P)Mass| for the $h_b(2P)$.
The width generator is \verb|h_b(2P)Width| for the $h_b(2P)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 8:30:2 on the 24th of April 2007. The most recently changed decay mode was modified at 13:57:54 on the 30th of July 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
