% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $e^-$}\ \ \ \ \ \ \ $*****$}
\maketitle
The $e^-$ is the first generation charged lepton.
The $e^-$ has mass $0.51099892$~MeV and is stable. The $e^-$ has spin $1/2$, charge $-1$ and is colour neutral.
 The $e^-$ is a lepton.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 11.
 The particle is a potential beam particle.There are no decay modes for the $e^-$.



 There is no mass generator for the $e^-$.
 There is no width generator for the $e^-$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 10:39:30 on the 18th of October 2006. The most recently changed decay mode was modified at 0:0:0 on the 0th of 0. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
