% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $h_c$}\ \ \ \ \ \ \ $***$}
\maketitle
The mass is taken from \cite{Yao:2006px}. The width has not been measured and is set below the limit on the width from \cite{Yao:2006px}. The branching ratios have not been measured and we use the values from \cite{Eichten:2002qv} . The $h_c$ is allowed to be off-shell by ten times the width.
The $h_c$ has mass $3525.93$~MeV and is unstable. The $h_c$ has spin $1$, charge $0$ and is colour neutral.
 The $h_c$ is a meson and is from the $1^1P_1$ multiplet.The $h_c$ has width $0.9$~MeV. The lower limit on the mass of the particle is $9$~MeV and the upper limit is $9$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 10443.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $h_c$ (continues).}
\endfoot
\caption{The decay modes of the $h_c$.}
\endlastfoot
\label{tab:10443decaymodes}
0.600000 & $**$ & on & $ g, g, g $  & Decay of $h_c$ with branching ratio from \cite{Eichten:2002qv}    & Herwig::Quarkonium::QDecayME130 \\ 
\hline
0.400000 & $**$ & on & $ \eta_c, \gamma $  & Decay of $h_c$ with branching ratio from \cite{Eichten:2002qv}    & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
\end{longtable}The $h_c$ decay modes are given in Table~\ref{tab:10443decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|h_cmass| for the $h_c$.
The width generator is \verb|h_cwidth| for the $h_c$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 20:16:50 on the 2nd of August 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:51:14 on the 3rd of November 2006.

\end{document}
