% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $D_{s0}^+$}\ \ \ \ \ \ \ $***$}
\maketitle
The $D_{s0}^+$ is the lightest scalar containing a charm and strange quark. This state has been observed and the mass measured. The width is less than the experimental resolution and therefore the value we use is taken from \cite{Bardeen:2003kt} . This is lower than the 1 MeV used in EvtGen. The $D_{s0}^+$ is allowed to be off-shell by ten times the width.
The $D_{s0}^+$ has mass $2317.3$~MeV and is unstable. The $D_{s0}^+$ has spin $0$, charge $1$ and is colour neutral.
 The $D_{s0}^+$ is a meson and is from the $1^3P_0$ multiplet.The $D_{s0}^+$ has width $0.0232$~MeV. The lower limit on the mass of the particle is $0.232$~MeV and the upper limit is $0.232$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 10431.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $D_{s0}^+$ (continues).}
\endfoot
\caption{The decay modes of the $D_{s0}^+$.}
\endlastfoot
\label{tab:10431decaymodes}
1.000000 & $***$ & on & $ D_s^+, \pi^0 $  & The only observed decay of $D_{s0}^+$ which we assume is the only mode.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
\end{longtable}The $D_{s0}^+$ decay modes are given in Table~\ref{tab:10431decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|D_s0+mass| for the $D_{s0}^+$.
The width generator is \verb|D_s0+width| for the $D_{s0}^+$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:27:10 on the 20th of October 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 21:34:23 on the 2nd of August 2007.

\end{document}
