\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $D_0^{*0}$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &10421 & & & Mass & 2369& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 274& & & Gen  & \verb: D_0*0: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $D_0^{*0} $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:D_00mass: \ \ & Width Gen.  & \verb:D_00width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$**$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $0$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 274& Upper cut & 822& PDG link &m178 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

This state has been observed as a broad resonance by both BELLE and FOCUS. We average the BELLE and FOCUS values for the mass and width from \cite{Yao:2006px} for both charge states due to the large errors rather than using the \cite{Yao:2006px} value. We assume that the width is saturated by $D\pi$ which is the only observed mode. The $D_0^{*0}$ is only allowed to be off shell below the mass by the width so the decay is possible and three times the width above the central value due to the large width. The mass is 60 MeV higher than the EvtGen and the width is marginally higher because EvtGen uses the BELLE result rather than an average.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $D_0^{*0}$ (continues).}
\endfoot
\caption{The decay modes of the $D_0^{*0}$.}
\endlastfoot
\label{tab:10421decaymodes}
0.666667 & $***$ & $D^+$, $\pi^-$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
0.333333 & $***$ & $D^0$, $\pi^0$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
