\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $h'_1$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &10333 & & & Mass & 1386& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 91& & & Gen  & \verb: h'_1: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $h'_1 $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:h'_1mass: \ \ & Width Gen.  & \verb:h'_1width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$**$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 182& Upper cut & 182& PDG link &m109 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $h'_1$ has been observed but needs confirmation. The mass and width are not well measured and only one type of mode has been observed which we assume is the only type of mode with the relative contributions given by isosoin. These modes are not allowed if the particles are all on-shell. The particle is allowed to be off-shell twice the width.


\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $h'_1$ (continues).}
\endfoot
\caption{The decay modes of the $h'_1$.}
\endlastfoot
\label{tab:10333decaymodes}
0.250000 & $***$ & $K^{*+}$, $K^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.250000 & $***$ & $K^{*0}$, $\bar{K}^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.250000 & $***$ & $\bar{K}^{*0}$, $K^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.250000 & $***$ & $K^{*-}$, $K^+$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
