% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $h'_1$}\ \ \ \ \ \ \ $**$}
\maketitle
The $h'_1$ has been observed but needs confirmation. The mass and width are not well measured and only one type of mode has been observed which we assume is the only type of mode with the relative contributions given by isosoin. These modes are not allowed if the particles are all on-shell. The particle is allowed to be off-shell twice the width.


The $h'_1$ has mass $1386$~MeV and is unstable. The $h'_1$ has spin $1$, charge $0$ and is colour neutral.
 The $h'_1$ is a meson and is from the $1^1P_1$ multiplet.The $h'_1$ has width $91$~MeV. The lower limit on the mass of the particle is $182$~MeV and the upper limit is $182$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 10333.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $h'_1$ (continues).}
\endfoot
\caption{The decay modes of the $h'_1$.}
\endlastfoot
\label{tab:10333decaymodes}
0.250000 & $***$ & on & $ K^{*+}, K^- $  & The decay of the $h'_1$ to $K^*K$ with branching ratio given by isospin.   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
0.250000 & $***$ & on & $ K^{*0}, \bar{K}^0 $  & The decay of the $h'_1$ to $K^*K$ with branching ratio given by isospin.   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
0.250000 & $***$ & on & $ \bar{K}^{*0}, K^0 $  & The decay of the $h'_1$ to $K^*K$ with branching ratio given by isospin.   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
0.250000 & $***$ & on & $ K^{*-}, K^+ $  & The decay of the $h'_1$ to $K^*K$ with branching ratio given by isospin.   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
\end{longtable}The $h'_1$ decay modes are given in Table~\ref{tab:10333decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|h'_1mass| for the $h'_1$.
The width generator is \verb|h'_1width| for the $h'_1$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 15:43:1 on the 22nd of August 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:41:44 on the 21st of August 2007.

\end{document}
