\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\pi_2^0(1670)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &10115 & & & Mass & 1672.4& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 259& & & Gen  & \verb: pi_20: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\pi_2^0(1670) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:pi_20Mass: \ \ & Width Gen.  & \verb:pi_20Width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$****$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $2$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 259& Upper cut & 259& PDG link &m034 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\pi_2^0(1670)$ is the neutral member of the isospin triplet from the pseudotensor multiplet. It mass and width are accurately measured and the branching ratios for a number of modes are known. The branching ratios in the \cite{Yao:2006px} are constrained to sum to one only include the three pion modes and the $KK^*$ modes. We have therefore rescaled these modes to include the $\omega\rho$ modes. We have included the $f_2\pi$, $\rho\pi$ and $(\pi\pi)_S\pi$ modes which sum to give the total three pion rate in the \cite{Yao:2006px}. We have chosen to interpret the $(\pi\pi)_S\pi$ as $\sigma\pi$ and this is in agreement with the measurement of this mode. We allow the $\pi_2^0(1670)$ to be off-shell by the width due to the large width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\pi_2^0(1670)$ (continues).}
\endfoot
\caption{The decay modes of the $\pi_2^0(1670)$.}
\endlastfoot
\label{tab:10115decaymodes}
0.546654 & $***$ & $\pi^0$, $f_2(1270)$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.150768 & $***$ & $\rho^+$, $\pi^-$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.150768 & $***$ & $\rho^-$, $\pi^+$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.084624 & $***$ & $\pi^0$, $\sigma$ & & Herwig::TensorMeson2PScalar::Tensor2PScalar& \\ 
& & & & & \\ \hline
0.026290 & $***$ & $\rho^0$, $\omega$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.010224 & $***$ & $K^{*+}$, $K^-$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.010224 & $***$ & $K^{*0}$, $\bar{K}^0$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.010224 & $***$ & $K^{*-}$, $K^+$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
0.010224 & $***$ & $\bar{K}^{*0}$, $K^0$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
