\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $a_0^0(1450)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &10111 & & & Mass & 1474& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 265& & & Gen  & \verb: a'_00: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $a_0^0(1450) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:a'_00mass: \ \ & Width Gen.  & \verb:a'_00width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $0$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 265& Upper cut & 265& PDG link &m149 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $a_0^0(1450)$ is assigned as the charged member of the isospin triplet from the lightest scalar multiplet, due to the uncertainty over which scalar mesons belong to which multiplet this meson could be replaced by the $a_0(980)$. The mass and width are taken from \cite{Yao:2006px}. The branching ratios are not given in \cite{Yao:2006px} and therefore we have used the values for the ratios of branching ratios
\begin{eqnarray}
\frac{\Gamma(\pi\eta')}{\Gamma(\pi\eta)} &=& 0.35\pm0.16,\\
\frac{\Gamma(K\bar{K})}{\Gamma(\pi\eta)} &=& 0.88\pm0.23,\\
\frac{\Gamma(\omega\pi\pi)}{\Gamma(\pi\eta)} &=& 10.7\pm2.3,
\end{eqnarray}
  together with the assumption that these are the only modes to calculate the branching ratios.  The $a_0^0(1450)$ is allowed to be off-shell by the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $a_0^0(1450)$ (continues).}
\endfoot
\caption{The decay modes of the $a_0^0(1450)$.}
\endlastfoot
\label{tab:10111decaymodes}
0.827533 & $***$ & $\omega$, $\rho^0$ & & Herwig::ScalarVectorVector::SVV& \\ 
& & & & & \\ \hline
0.077340 & $***$ & $\pi^0$, $\eta$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
0.034029 & $***$ & $K^-$, $K^+$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
0.034029 & $***$ & $\bar{K}^0$, $K^0$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
0.027069 & $***$ & $\pi^0$, $\eta'$ & & Herwig::ScalarScalarScalar::ScalarSS& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
