\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\eta_b(2S)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &100551 & & & Mass & 9996& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 4.1& & & Gen  & \verb: eta_b(2S): & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\eta_b(2S) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:eta_b2Smass: \ \ & Width Gen.  & \verb:eta_b2Swidth: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$*$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $0$& Charge & $0$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 41& Upper cut & 41& PDG link & & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\eta_b(2S)$ has not been observed and is included with mass, width and decay modes taken from \cite{Godfrey:2002rp}  to complete the multiplet. The $\eta_b(2S)$ is allowed to be off-shell by ten times the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\eta_b(2S)$ (continues).}
\endfoot
\caption{The decay modes of the $\eta_b(2S)$.}
\endlastfoot
\label{tab:100551decaymodes}
0.994300 & $**$ & $g$, $g$ & & Herwig::Quarkonium::QDecayME0& \\ 
& & & & & \\ \hline
0.005700 & $*$ & $h_b$, $\gamma$ & & Herwig::Hw64::DecayME0& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
