% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\chi_{c2}(2P)$}\ \ \ \ \ \ \ $***$}
\maketitle
The $\chi_{c2}(2P)$ was recently observed by BELLE. The mass and width are taken from this measurementin in \cite{Yao:2006px}. The decay to $D\bar{D}$ is the only observed strong decay mode and we therefore take this to be the only mode with the relative fraction of the two mode calculated using the decayer.
The $\chi_{c2}(2P)$ has mass $3929$~MeV and is unstable. The $\chi_{c2}(2P)$ has spin $2$, charge $0$ and is colour neutral.
 The $\chi_{c2}(2P)$ is a meson and is from the $2^3P_2$ multiplet.The $\chi_{c2}(2P)$ has width $29$~MeV. The lower limit on the mass of the particle is $290$~MeV and the upper limit is $290$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 100445.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\chi_{c2}(2P)$ (continues).}
\endfoot
\caption{The decay modes of the $\chi_{c2}(2P)$.}
\endlastfoot
\label{tab:100445decaymodes}
0.529100 & $***$ & on & $ D^0, \bar{D}^0 $  & Decay of $\chi_{c2}(2P)$ with branching ratio calculated using the decayer.   & Herwig::TensorMeson2PScalar::Tensor2PScalar \\ 
\hline
0.470900 & $***$ & on & $ D^+, D^- $  & Decay of $\chi_{c2}(2P)$ with branching ratio calculated using the decayer.   & Herwig::TensorMeson2PScalar::Tensor2PScalar \\ 
\hline
\end{longtable}The $\chi_{c2}(2P)$ decay modes are given in Table~\ref{tab:100445decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|chi_c22Pmass| for the $\chi_{c2}(2P)$.
The width generator is \verb|chi_c22PWidth| for the $\chi_{c2}(2P)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:40:55 on the 20th of October 2007. The most recently changed decay mode was modified at 13:23:45 on the 3rd of November 2006. The particle data was last modified at 12:21:29 on the 24th of April 2007.

\end{document}
