% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\eta(1295)$}\ \ \ \ \ \ \ $***$}
\maketitle
The $\eta(1295)$ is the lighter isospin singlet meson from the second pseudoscalar multiplet. The mass and width are taken from \cite{Yao:2006px}. The branching ratios are not given in \cite{Yao:2006px}. We assume that the observed $\eta\pi\pi$ modes are the only decay modes, apart from a small $KK\pi$ component in $a_0\pi$. The rates of the $a_0\pi$ and $\eta\sigma$ modes are calculated using the branching fraction ratios from \cite{Yao:2006px} and assuming the $\eta\sigma$ dominates the $\eta(\pi\pi)_{\rm s-wave}$. The lower limit on the mass is set to ensure the decays are possible and the upper limit to ten times the width.
The $\eta(1295)$ has mass $1294$~MeV and is unstable. The $\eta(1295)$ has spin $0$, charge $0$ and is colour neutral.
 The $\eta(1295)$ is a meson and is from the $2^1S_0$ multiplet.The $\eta(1295)$ has width $55$~MeV. The lower limit on the mass of the particle is $240$~MeV and the upper limit is $550$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is 100221.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\eta(1295)$ (continues).}
\endfoot
\caption{The decay modes of the $\eta(1295)$.}
\endlastfoot
\label{tab:100221decaymodes}
0.349999 & $***$ & on & $ \sigma, \eta $  & Decay of $\eta(1295)$ with branching ratio calculated as described above.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
0.216667 & $***$ & on & $ a^0_0(980), \pi^0 $  & Decay of $\eta(1295)$ with branching ratio calculated as described above.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
0.216667 & $***$ & on & $ a^+_0(980), \pi^- $  & Decay of $\eta(1295)$ with branching ratio calculated as described above.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
0.216667 & $***$ & on & $ a^-_0(980), \pi^+ $  & Decay of $\eta(1295)$ with branching ratio calculated as described above.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
\end{longtable}The $\eta(1295)$ decay modes are given in Table~\ref{tab:100221decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|eta''mass| for the $\eta(1295)$.
The width generator is \verb|eta(1295)width| for the $\eta(1295)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:39:23 on the 20th of October 2007. The most recently changed decay mode was modified at 16:18:45 on the 2nd of August 2007. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
