% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\bar{B}^0_{s2}$}\ \ \ \ \ \ \ $**$}
\maketitle
The $\bar{B}^0_{s2}$ is $s\bar{b}$ member of the lightest tensor multiplet. We use the mass from the recent observation of CDF \cite{Filthaut:2007gs} . The mass difference with the lightest state is such that the strong decays to $BK$ and $B^*K$ are allowed.  We use the width and branching ratios from \cite{DiPierro:2001uu} , rescaled to the observed mass. The $\bar{B}^0_{s2}$ is allowed to be off-shell by ten times the width.
The $\bar{B}^0_{s2}$ has mass $5839.6$~MeV and is unstable. The $\bar{B}^0_{s2}$ has spin $2$, charge $0$ and is colour neutral.
 The $\bar{B}^0_{s2}$ is a meson and is from the $1^3P_2$ multiplet.The $\bar{B}^0_{s2}$ has width $0.7$~MeV. The lower limit on the mass of the particle is $7$~MeV and the upper limit is $7$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -535.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{B}^0_{s2}$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{B}^0_{s2}$.}
\endlastfoot
\label{tab:-535decaymodes}
0.470000 & $**$ & on & $ B^-, K^+ $  & Decay mode of $\bar{B}^0_{s2}$ wth branching ratio from \cite{DiPierro:2001uu} .   & Herwig::TensorMeson2PScalar::Tensor2PScalar \\ 
\hline
0.470000 & $**$ & on & $ \bar{B}^0, K^0 $  & Decay mode of $\bar{B}^0_{s2}$ wth branching ratio from \cite{DiPierro:2001uu} .   & Herwig::TensorMeson2PScalar::Tensor2PScalar \\ 
\hline
0.030000 & $**$ & on & $ \bar{B}^{*0}, K^0 $  & Decay mode of $\bar{B}^0_{s2}$ wth branching ratio from \cite{DiPierro:2001uu} .   & Herwig::TensorMesonVectorPScalar::TensorVP \\ 
\hline
0.030000 & $**$ & on & $ B^{*-}, K^+ $  & Decay mode of $\bar{B}^0_{s2}$ wth branching ratio from \cite{DiPierro:2001uu} .   & Herwig::TensorMesonVectorPScalar::TensorVP \\ 
\hline
\end{longtable}The $\bar{B}^0_{s2}$ decay modes are given in Table~\ref{tab:-535decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|B_s20mass| for the $\bar{B}^0_{s2}$.
The width generator is \verb|B_s20width| for the $\bar{B}^0_{s2}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 18:8:45 on the 9th of August 2007. The most recently changed decay mode was modified at 13:59:38 on the 3rd of August 2007. The particle data was last modified at 10:59:13 on the 6th of August 2007.

\end{document}
