\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\bar{\Omega}_b^{*+}$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-5334 & & & Mass & 6105.84& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 0.005& & & Gen  & \verb: Omega_b*bar+: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\bar{\Omega}_b^{*+} $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:Omega_b*-Mass: \ \ & Width Gen.  & \verb:Omega_b*-Width: \ \ & Type        & baryon \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$*$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $3/2$& Charge & $1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 0.05& Upper cut & 0.05& PDG link & & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\bar{\Omega}_b^{*+}$ has not been observed and is only included to complete the lightest multiplet of baryons containing one bottom quark. The mass is calculated using the mass splitting from the charm system and the mass of the $\Lambda_b$ which gives a higher mass than many theoretical calculations. Due to the mass difference with the $\Omega_b$ there are no strong decay modes allowed and therefore we assume the radiative mode is the only one. The width is calculated using the decayer and the $\bar{\Omega}_b^{*+}$ is allowed to be off-shell by ten times the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{\Omega}_b^{*+}$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{\Omega}_b^{*+}$.}
\endlastfoot
\label{tab:-5334decaymodes}
1.000000 & $**$ & $\bar{\Omega}_b^+$, $\gamma$ & & Herwig::RadiativeHeavyBaryon::HeavyGamma& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
