\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\bar{\Xi'}_b^+$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-5312 & & & Mass & 5899.9& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 0.00018& & & Gen  & \verb: Xi_b'bar+: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\bar{\Xi'}_b^+ $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:Xi'_b-Mass: \ \ & Width Gen.  & \verb:Xi'_b-Width: \ \ & Type        & baryon \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$**$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1/2$& Charge & $1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 0.0018& Upper cut & 0.0018& PDG link & & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\bar{\Xi'}_b^+$ has not been observed and is only included to complete the lightest baryon multiplet with one bottom quark. The mass is obtained using the mass difference from the charm system and the mass of the $\Xi_b$, this is lower than theoretical calculations. The mass difference is such that there are no allowed strong decay modes and therefore we assume that the radiative mode with a photon is the only mode. The width is calculated using the decay and the $\bar{\Xi'}_b^+$ is allowed to be off-shell by ten times this width. 
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{\Xi'}_b^+$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{\Xi'}_b^+$.}
\endlastfoot
\label{tab:-5312decaymodes}
1.000000 & $**$ & $\bar{\Xi}_b^+$, $\gamma$ & & Herwig::RadiativeHeavyBaryon::HeavyGamma& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
