% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\bar{D}^{*0}(2007)$}\ \ \ \ \ \ \ $****$}
\maketitle
The $\bar{D}^{*0}(2007)$ is the neutral charm member of the lightest vector multiplet. The width has not been measured and therefore we used the measured $D^{*+}$ width and the branching ratios into $D\pi$ to calculate the $D^*D\pi$ coupling. This coupling was used with the $D\pi$ branching ratio to obtain the width. The branching ratios are taken from \cite{Yao:2006px}. The $\bar{D}^{*0}(2007)$ is allowed to be off-shell by ten times the width.
The $\bar{D}^{*0}(2007)$ has mass $2006.7$~MeV and is unstable. The $\bar{D}^{*0}(2007)$ has spin $1$, charge $0$ and is colour neutral.
 The $\bar{D}^{*0}(2007)$ is a meson and is from the $1^3S_1$ multiplet.The $\bar{D}^{*0}(2007)$ has width $0.068$~MeV. The lower limit on the mass of the particle is $0.68$~MeV and the upper limit is $0.68$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -423.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{D}^{*0}(2007)$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{D}^{*0}(2007)$.}
\endlastfoot
\label{tab:-423decaymodes}
0.619000 & $*****$ & on & $ \bar{D}^0, \pi^0 $  & The decay of $\bar{D}^{*0}(2007)$ to $D\pi$ using the branching ratio from \cite{Yao:2006px}.   & Herwig::VectorMeson2Meson::Vector2Meson \\ 
\hline
0.381000 & $*****$ & on & $ \bar{D}^0, \gamma $  & The radiative decay of the $\bar{D}^{*0}(2007)$ using the branching ratio from \cite{Yao:2006px}.   & Herwig::VectorMesonVectorPScalar::VectorVP \\ 
\hline
\end{longtable}The $\bar{D}^{*0}(2007)$ decay modes are given in Table~\ref{tab:-423decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|D*0mass| for the $\bar{D}^{*0}(2007)$.
The width generator is \verb|D*0width| for the $\bar{D}^{*0}(2007)$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 11:52:0 on the 15th of April 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
