% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $(\bar{c}\bar{u})_0$}\ \ \ \ \ \ \ $*$}
\maketitle
  The diquark containing an charm and an up quark in a spin-$0$ state. This is an invented particle to allow the simulation of baryons, it is not currently used.
The $(\bar{c}\bar{u})_0$ has mass $1925$~MeV and is stable. The $(\bar{c}\bar{u})_0$ has spin $0$, charge $-4/3$ and is in a colour triplet.
 The $(\bar{c}\bar{u})_0$ is a diquark.
The particle is a constituent of the hadrons and the constituent mass is 1925 MeV. The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -4201.
There are no decay modes for the $(\bar{c}\bar{u})_0$.



 There is no mass generator for the $(\bar{c}\bar{u})_0$.
 There is no width generator for the $(\bar{c}\bar{u})_0$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 11:33:33 on the 21st of October 2007. The most recently changed decay mode was modified at 0:0:0 on the 0th of 0. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
