% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\bar{\Lambda}_c(2625)^-$}\ \ \ \ \ \ \ $***$}
\maketitle
 The $\bar{\Lambda}_c(2625)^-$ is the second $\Lambda_c$ resonance. It was not previously included but has been observed. The mass is taken from \cite{Yao:2006px} but the width has not been measured and we take a value below the limit. Only one decay mode has been observed, of the two strong modes which are possible. There are limits on the other possible mode. We therefore assume that this mode, and the other mode required by isospin conservation are the only decay modes. The $\bar{\Lambda}_c(2625)^-$ is allowed to be off-shell by five times the width.
The $\bar{\Lambda}_c(2625)^-$ has mass $2628.1$~MeV and is unstable. The $\bar{\Lambda}_c(2625)^-$ has spin $3/2$, charge $-1$ and is colour neutral.
 The $\bar{\Lambda}_c(2625)^-$ is a baryon$\bar{10}$plet.The $\bar{\Lambda}_c(2625)^-$ has width $1.5$~MeV. The lower limit on the mass of the particle is $7.5$~MeV and the upper limit is $7.5$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -4124.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{\Lambda}_c(2625)^-$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{\Lambda}_c(2625)^-$.}
\endlastfoot
\label{tab:-4124decaymodes}
0.666667 & $****$ & on & $ \bar{\Lambda}_c^-, \pi^+, \pi^- $  & Decay of the $\bar{\Lambda}_c(2625)^-$ to $\Lambda_c\pi\pi$. The charged pion modes has been observed and the neutral pion mode is infered using isospin conservation.   & Herwig::Hw64::DecayME0 \\ 
\hline
0.333333 & $****$ & on & $ \bar{\Lambda}_c^-, \pi^0, \pi^0 $  & Decay of the $\bar{\Lambda}_c(2625)^-$ to $\Lambda_c\pi\pi$. The charged pion modes has been observed and the neutral pion mode is infered using isospin conservation.   & Herwig::Hw64::DecayME0 \\ 
\hline
\end{longtable}The $\bar{\Lambda}_c(2625)^-$ decay modes are given in Table~\ref{tab:-4124decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|Lambda*_cMass| for the $\bar{\Lambda}_c(2625)^-$.
The width generator is \verb|Lambda*_cWidth| for the $\bar{\Lambda}_c(2625)^-$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 9:20:8 on the 4th of February 2009. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:1:37 on the 6th of July 2008.

\end{document}
