\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ ${D'}_1^-$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-20413 & & & Mass & 2438& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 329& & & Gen  & \verb: D'_1-: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & ${D'}_1^- $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:D'_1+mass: \ \ & Width Gen.  & \verb:D'_1+width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $-1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 250& Upper cut & 658& PDG link &m180 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

here is evidence for the neutral ${D'}^1$ state from both CLEO and BELLE, however only the BELLE result is included in \cite{Yao:2006px}. We include this state with the mass and width taken from \cite{Colangelo:2004vu} , which is the average of the two experimental results. There has only been one observed mode which we assume is the only mode. The lower limit on the off-shell mass is set so that the decay is kinematically allowed and the upper limit is twice the width given the large width. EvtGen takes a similar approach but uses the mass and width from the CLEO results \cite{Anderson:1999wn} .
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the ${D'}_1^-$ (continues).}
\endfoot
\caption{The decay modes of the ${D'}_1^-$.}
\endlastfoot
\label{tab:-20413decaymodes}
0.666667 & $***$ & $\bar{D}^{*0}(2007)$, $\pi^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.333333 & $***$ & $D^{*-}(2010)$, $\pi^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
