Check List for Particle : d̄

April 21, 2009

Quantity Us PDG EvtGen Quantity Us PDG EvtGen PDG -1 Mass 5 Code Width 0 Gen dbar Name Decay 0 m. Length

Latex Name d̄ Mass Gen. Width Gen. Type quark

Type constituent Con. Mass 325 Rating ∗ ∗ ∗ ∗ ∗ Variable fixed Ratio Stable stable Spin 1/2 Charge 1/3 Colour -3

Lower Cut 0 Upper cut 0 PDG link q123

• Is the description present and correct?

The down quark is the isospin=−1/2 first generation quark. The physical mass is at the centre of the range quoted in [?] and is only used as a coupling while the constituent mass is used kinematically.

• References?

Branching Rating Outgoing Description Decayer EvtGen

Ratio Particles

Table 1: The decay modes of the d̄.

Total branching ratio is 0.