% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\mu^+$}\ \ \ \ \ \ \ $*****$}
\maketitle
 The $\mu^+$ is the second generation charged lepton. The decay mode is included, take from PDG, although the muon is stable on collider time-scales.
The $\mu^+$ has mass $105.658369$~MeV and is stable. The $\mu^+$ has spin $1/2$, charge $1$ and is colour neutral.
 The $\mu^+$ is a lepton.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The decay length is $658.654$~m. The PDG code is -13.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\mu^+$ (continues).}
\endfoot
\caption{The decay modes of the $\mu^+$.}
\endlastfoot
\label{tab:-13decaymodes}
1.000000 & $*****$ & on & $ e^+, \nu_e, \bar{\nu}_\mu $  & Only muon decay mode.   & Herwig::Hw64::DecayME100 \\ 
\hline
\end{longtable}The $\mu^+$ decay modes are given in Table~\ref{tab:-13decaymodes} and the total branching ratio is $1$.


 There is no mass generator for the $\mu^+$.
 There is no width generator for the $\mu^+$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 10:52:55 on the 18th of October 2006. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 16:24:39 on the 10th of October 2006.

\end{document}
