% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\bar{B}^0_{s1}$}\ \ \ \ \ \ \ $**$}
\maketitle
The $\bar{B}^0_{s1}$ is $s\bar{b}$ member of the lightest pesudovector multiplet. We use the mass from the recent observation of CDF \cite{Filthaut:2007gs} . The mass difference with the lightest state is such that the strong decay to $B^*K$ is allowed.  We use the width and branching ratios from \cite{DiPierro:2001uu} , rescaled to the observed mass. The $\bar{B}^0_{s1}$ is allowed to be off-shell by ten times the width. 
The $\bar{B}^0_{s1}$ has mass $5829.4$~MeV and is unstable. The $\bar{B}^0_{s1}$ has spin $1$, charge $0$ and is colour neutral.
 The $\bar{B}^0_{s1}$ is a meson and is from the $1^1P_1$ multiplet.The $\bar{B}^0_{s1}$ has width $0.3$~MeV. The lower limit on the mass of the particle is $3$~MeV and the upper limit is $3$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -10533.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{B}^0_{s1}$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{B}^0_{s1}$.}
\endlastfoot
\label{tab:-10533decaymodes}
0.500000 & $**$ & on & $ \bar{B}^{*0}, K^0 $  & Decay of the $\bar{B}^0_{s1}$ to $B^*K$   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
0.500000 & $**$ & on & $ B^{*-}, K^+ $  & Decay of the $\bar{B}^0_{s1}$ to $B^*K$   & Herwig::PVectorMesonVectorPScalar::PVectorVP \\ 
\hline
\end{longtable}The $\bar{B}^0_{s1}$ decay modes are given in Table~\ref{tab:-10533decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|B_s10mass| for the $\bar{B}^0_{s1}$.
The width generator is \verb|B_s10width| for the $\bar{B}^0_{s1}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 21:25:5 on the 20th of October 2007. The most recently changed decay mode was modified at 13:32:55 on the 3rd of August 2007. The particle data was last modified at 19:7:7 on the 9th of August 2007.

\end{document}
