% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $\bar{D}_0^{*0}$}\ \ \ \ \ \ \ $**$}
\maketitle
This state has been observed as a broad resonance by both BELLE and FOCUS. We average the BELLE and FOCUS values for the mass and width from \cite{Yao:2006px} for both charge states due to the large errors rather than using the \cite{Yao:2006px} value. We assume that the width is saturated by $D\pi$ which is the only observed mode. The $\bar{D}_0^{*0}$ is only allowed to be off shell below the mass by the width so the decay is possible and three times the width above the central value due to the large width. The mass is 60 MeV higher than the EvtGen and the width is marginally higher because EvtGen uses the BELLE result rather than an average.
The $\bar{D}_0^{*0}$ has mass $2369$~MeV and is unstable. The $\bar{D}_0^{*0}$ has spin $0$, charge $0$ and is colour neutral.
 The $\bar{D}_0^{*0}$ is a meson and is from the $1^3P_0$ multiplet.The $\bar{D}_0^{*0}$ has width $274$~MeV. The lower limit on the mass of the particle is $274$~MeV and the upper limit is $822$~MeV. These are the deviations from the on-shell value. The branching ratios are fixed.
The properties of the particle and its antiparticle are taken to be charge-conjugate to each other.
 The PDG code is -10421.
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|p{2.5in}|c|}
\hline
Branching & Rating & On/ & Outgoing  & Description & Decayer  \\ 
Ratio     &                                 & Off & Particles &             &         \\ 
\hline
\endhead
\caption{The decay modes of the $\bar{D}_0^{*0}$ (continues).}
\endfoot
\caption{The decay modes of the $\bar{D}_0^{*0}$.}
\endlastfoot
\label{tab:-10421decaymodes}
0.666667 & $***$ & on & $ D^-, \pi^+ $  & Only observed decay mode of $\bar{D}_0^{*0}$ which we assume is the only mode.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
0.333333 & $***$ & on & $ \bar{D}^0, \pi^0 $  & Only observed decay mode of $\bar{D}_0^{*0}$ which we assume is the only mode.   & Herwig::ScalarScalarScalar::ScalarSS \\ 
\hline
\end{longtable}The $\bar{D}_0^{*0}$ decay modes are given in Table~\ref{tab:-10421decaymodes} and the total branching ratio is $1$.


The mass generator is \verb|D_00mass| for the $\bar{D}_0^{*0}$.
The width generator is \verb|D_00width| for the $\bar{D}_0^{*0}$.

\bibliography{particles}


 The particle was checked by Peter Richardson at 12:54:20 on the 15th of April 2007. The most recently changed decay mode was modified at 23:10:55 on the 3rd of April 2005. The particle data was last modified at 13:48:21 on the 17th of October 2006.

\end{document}
