\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $K_1^-(1270)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-10323 & & & Mass & 1272& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 90& & & Gen  & \verb: K_1-: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $K_1^-(1270) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:K_1+mass: \ \ & Width Gen.  & \verb:K_1+width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$****$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & variable \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $-1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 180& Upper cut & 180& PDG link &m028 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $K_1^-(1270)$ is a mixture of the $K$-mesons from the two lightest pseudovector multiplets. We have assigned it to the $1^1P_1$ multiplet along with the lighter states for the pseudovector mesons which mix and contain heavy quarks. The mass, width and branching ratios are taken from \cite{Yao:2006px}. The $Kf_0(1370)$ mode would be very off-shell and so is not included and the $K\omega$ mode is scaled down by $2\sigma$ as it is also off-shell. The limit on the off-shellness of the particle is set to twice the width.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $K_1^-(1270)$ (continues).}
\endfoot
\caption{The decay modes of the $K_1^-(1270)$.}
\endlastfoot
\label{tab:-10323decaymodes}
0.298667 & $****$ & $\rho^-$, $\bar{K}^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.199111 & $****$ & $\bar{K}^{*0}_0(1430)$, $\pi^-$ & & Herwig::VectorMeson2Meson::Vector2Meson& \\ 
& & & & & \\ \hline
0.149333 & $****$ & $\rho^0$, $K^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.122222 & $***$ & $\bar{K}^{*0}$, $\pi^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.099556 & $****$ & $K^{*-}_0(1430)$, $\pi^0$ & & Herwig::VectorMeson2Meson::Vector2Meson& \\ 
& & & & & \\ \hline
0.070000 & $****$ & $K^-$, $\omega$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.061111 & $***$ & $K^{*-}$, $\pi^0$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
