\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $b_1^-$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-10213 & & & Mass & 1229.5& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 142& & & Gen  & \verb: b_1-: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $b_1^- $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:b_1+mass: \ \ & Width Gen.  & \verb:b_1+width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$****$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $-1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 300& Upper cut & 710& PDG link &m011 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $b_1^-$ is part of the isospin triplet for the lightest pseudovector multiplet. The mass and width are measured but only a few decay modes have been observed. The partial width for the $\pi^\pm\gamma$ mode has been measured and the $\omega\pi$ mode is dominant. We have only included these modes. The lower limit on the mass of the particle is set to ensure the $\omega$ can remain on-mass shell. Due to the large width the upper limit is set to five times the width rather than the normal ten.

\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $b_1^-$ (continues).}
\endfoot
\caption{The decay modes of the $b_1^-$.}
\endlastfoot
\label{tab:-10213decaymodes}
0.998400 & $*****$ & $\omega$, $\pi^-$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
0.001600 & $***$ & $\pi^-$, $\gamma$ & & Herwig::PVectorMesonVectorPScalar::PVectorVP& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
