\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\pagestyle{empty}
\begin{document}
\title{Check List for Particle : \boldmath{ $\rho^-(1450)$}}
\maketitle
\begin{center}
\begin{tabular}{|c|c|c|c||c|c|c|c|}
\hline
Quantity &\ \ \  Us \ \ \ &\ \ \ PDG \ \ \ &\ \ \  EvtGen \ \ \ & Quantity & \ \ \ Us \ \ \ & \ \ \ PDG \ \ \ & \ \ \ EvtGen \ \ \ \\ 
\hline
PDG  &-100213 & & & Mass & 1459& &\\ 
Code & & & &      & & &\\ 
\hline 
Width  & 147& & & Gen  & \verb: rho'-: & &\\ 
       & & & & Name & & &\\ 
\hline
Decay  & $0$~m.& & &   & & &\\ 
Length & & & & & & &\\ 
\hline 
\end{tabular} 
\end{center} 
\vspace{2cm}
\begin{center}
\begin{tabular}{|c|c|c|c|c|c|c|c|}
\hline
Latex Name  & $\rho^-(1450) $ \ \ \ \ \ \ \ \ \ \ \ \ & Mass Gen.   & \verb:rho'+mass: \ \ & Width Gen.  & \verb:rho'+width: \ \ & Type        & meson \ \ \ \ \ \\ 
& & & & & & & \\ 
\hline
Type        & normal \ \ \ & Con. Mass   & 0 \ \ \ \ & Rating      &$***$ \ \ \ \ \ \ \ \ \ \ \ \ &Variable    & fixed \\ 
& & & & & & Ratio & \\ 
\hline
Stable & unstable & Spin   & $1$& Charge & $-1$ & Colour & 0\\ 
&&&&&&& \\ 
 \hline
Lower Cut & 294& Upper cut & 294& PDG link &m105 & & \\ 
\hline 
\end{tabular} 
\end{center} 
\begin{itemize}
\item Is the description present and correct?

The $\rho^-(1450)$ is the charged member of the isospin triplet from the $2^3S_1$. It is mainly included to act as an intermediate particle in many of the hadronic matrix elements containing excited $\rho$ resonances. The mass and width are taken from \cite{Yao:2006px}. The branching ratios are not given in \cite{Yao:2006px} and therefore we have used the numbers from \cite{Abele:2001pv}  assuming that there are only two and four pion modes. The $\rho^-(1450)$ is allowed to be off-shell by twice the width. It should be noted that the width is poorly measured and tends to change a lot between editions of the PDG.
\item References?
\end{itemize}
\setlongtables
\begin{longtable}[t]{|c|c|c|p{1in}|c|p{2.5in}|}
\hline
Branching & Rating & Outgoing  & Description & Decayer &  EvtGen \\ 
Ratio     &        & Particles &             &         & \\ 
\hline
\endhead
\caption{The decay modes of the $\rho^-(1450)$ (continues).}
\endfoot
\caption{The decay modes of the $\rho^-(1450)$.}
\endlastfoot
\label{tab:-100213decaymodes}
0.270072 & $***$ & $\pi^-$, $\pi^0$ & & Herwig::VectorMeson2Meson::Vector2Meson& \\ 
& & & & & \\ \hline
0.135037 & $***$ & $\pi^0(1300)$, $\pi^-$ & & Herwig::VectorMeson2Meson::Vector2Meson& \\ 
& & & & & \\ \hline
0.135037 & $***$ & $\pi^-(1300)$, $\pi^0$ & & Herwig::VectorMeson2Meson::Vector2Meson& \\ 
& & & & & \\ \hline
0.124088 & $***$ & $\rho^-$, $\sigma$ & & Herwig::VectorMesonVectorScalar::VVSDecayer& \\ 
& & & & & \\ \hline
0.098540 & $***$ & $a_1^0(1260)$, $\pi^-$ & & Herwig::VectorMesonPVectorPScalar::VAPDecayer& \\ 
& & & & & \\ \hline
0.098540 & $***$ & $a_1^-(1260)$, $\pi^0$ & & Herwig::VectorMesonPVectorPScalar::VAPDecayer& \\ 
& & & & & \\ \hline
0.080292 & $***$ & $\rho^-$, $\rho^0$ & & Herwig::VectorMesonVectorVector::VectorVV& \\ 
& & & & & \\ \hline
0.058394 & $***$ & $h_1$, $\pi^-$ & & Herwig::VectorMesonPVectorPScalar::VAPDecayer& \\ 
& & & & & \\ \hline
\end{longtable}Total branching ratio is $1$.
\bibliography{particles}

\end{document}
