% particle data information automatically produced from the herwig database
\documentclass[a4paper]{article}
\usepackage{cite,longtable}
\bibliographystyle{JHEP}
\topmargin -1.5cm
\textheight 26cm
\textwidth 20cm
\oddsidemargin -2cm
\evensidemargin 0cm
\begin{document}
\title{\boldmath{ $$}\ \ \ \ \ \ \ $$}
\maketitle

The $$ has mass $$~MeV and is . The $$ has spin $-1/2$, charge $0$ and is colour neutral.
 The $$ is a .
The properties of the particle and its antiparticle are taken to be independent. The PDG code is  and 1=2.
There are no decay modes for the $$.



 There is no mass generator for the $$.
 There is no width generator for the $$.

\bibliography{particles}


 The particle has not been checked. The most recently changed decay mode was modified at 0:0:0 on the 0th of 0. The particle data was last modified at 0:0:0 on the 0th of 0.

\end{document}
